
╔═════════╦════════════════════════════════════════════════════════════
║ GT-HELP ║ Special Codes for BBS files
╚═════════╩════════════════════════════════════════════════════════════


    Most of the "displayable" BBS files allow page breaks positions
    to be specified.


    Some of them also allow :

        Nesting of files.

        Colour codes - only SYSOP.BBS, GTMDIR.BBS and GTDIR.BBS files.


┌─────────────┐
│ Page Breaks │
└─────────────┘

    GT will by default insert a MORE? prompt when the screen becomes full.
    But it is usually convenient to predefine sensible positions for the
    breaks :

    a)  put a  (CTRL-R) at the beginning of the file to disable generation
        of default MORE prompts for the remainder of the file.

    b)  put a  (CTRL-E) at the beginning of a line on its own to instruct
        GT to generate a MORE prompt at that point.



